Foreign Language Reading Proficiency Examination Report

A student who is a candidate for the Ph.D. degree must pass a written test of his/her ability to translate from French, German, or Russian into English. The language test consists of the translation, with dictionary allowed, of a suitable passage from a mathematics paper or book in the language. The passage is to be about 175 words in length excluding any symbolic expressions and the exam period is thirty minutes. A completed copy of this form should be given to the graduate director after the exam is graded.

Student’s Name

Examiner’s Name

Passage(s) to be translated:

Date of Exam

Mark Pass Fail

Comments:

Examiner’s Signature